
CREATE DATABASE php_mysql_test;
USE php_mysql_test;

CREATE TABLE foobar (name VARCHAR(10), value INTEGER);
INSERT INTO foobar VALUES("fish", 42);

# It's not possible to use root user since MariaDB 10.4
# See https://mariadb.com/kb/en/authentication-plugin-unix-socket/
CREATE USER 'tester'@'localhost';
GRANT SELECT ON php_mysql_test.foobar TO 'tester'@'localhost';
